Scale OX457056.1:

Unmasked CpG

Simple Repeats

WM + SDust

5 kb GCA_949752795.1 76,818,000 76,819,000 76,820,000 76,821,000 76,822,000 76,823,000 76,824,000 76,825,000 76,826,000 GC Percent in 5-Base Windows

Augustus Gene Predictions RefSeq mRNAs mapped to this assembly CpG Islands (Islands < 300 Bases are Light Green)

RepeatMasker Repetitive Elements

Simple Tandem Repeats by TRF

Genomic Intervals Masked by WindowMasker + SDust

MamRTE1 (AT)n

L1MA9 (A)n L1MEd (ATCT)n Zaphod MLT1A0

L1ME3F MIR1_Amn (T)n L2c MIRb MER96B

GC Percent

Repeats