Scale KB390952:

1 Mb hub.falPer1 8,000,000 8,500,000 9,000,000 9,500,000 10,000,000 10,500,000 Human exons mapped by CESAR CSMD1 CSMD3

MYOM2 ARHGEF10

CLN8

DLGAP2

TDRP FBXO25

SH3YL1 ACP1 FAM150B