Scale KB019377:

1 Mb hub.camFer1 7,000,000 7,500,000 8,000,000 8,500,000 9,000,000 Human exons mapped by CESAR METTL15 KIF18A

BDNF LIN7C

LGR4

CCDC34

BBOX1 FIBIN

SLC5A12 ANO3 MUC15

LUZP2