Scale OX465124.1:

Unmasked CpG

Simple Repeats WM + SDust

5 kb GCA_949987615.1 17,823,000 17,824,000 17,825,000 17,826,000 17,827,000 17,828,000 17,829,000 17,830,000 17,831,000 GC Percent in 5-Base Windows Augustus Gene Predictions

RefSeq mRNAs mapped to this assembly CpG Islands (Islands < 300 Bases are Light Green) RepeatMasker Repetitive Elements Simple Tandem Repeats by TRF Genomic Intervals Masked by WindowMasker + SDust g1002.t1

g1003.t1 NM_001278730.2

GC Percent

Repeats