Scale CM063127.1:

Unmasked CpG

Simple Repeats WM + SDust

5 kb GCA_031885435.1 52,374,000 52,375,000 52,376,000 52,377,000 52,378,000 52,379,000 52,380,000 52,381,000 52,382,000 GC Percent in 5-Base Windows Augustus Gene Predictions RefSeq mRNAs mapped to this assembly CpG Islands (Islands < 300 Bases are Light Green) RepeatMasker Repetitive Elements Simple Tandem Repeats by TRF Genomic Intervals Masked by WindowMasker + SDust

GA-rich

GC Percent

Repeats