Scale OX344768.1:

Unmasked CpG

Simple Repeats

WM + SDust

5 kb GCA_947034865.1 12,143,000 12,144,000 12,145,000 12,146,000 12,147,000 12,148,000 12,149,000 12,150,000 12,151,000 GC Percent in 5-Base Windows

Augustus Gene Predictions RefSeq mRNAs mapped to this assembly

CpG Islands (Islands < 300 Bases are Light Green)

RepeatMasker Repetitive Elements

Simple Tandem Repeats by TRF

Genomic Intervals Masked by WindowMasker + SDust

NM_001376111.1

DR0313732 DR0314536 DR0588561 (TA)n DR0590282

(CT)n DR0314590 DR0590163

DR0316051 (GA)n (TCC)n

GC Percent

Repeats