Scale OV839360.1:

Unmasked CpG

Simple Repeats WM + SDust

5 kb GCA_929443795.2 29,923,000 29,924,000 29,925,000 29,926,000 29,927,000 29,928,000 29,929,000 29,930,000 29,931,000 GC Percent in 5-Base Windows Augustus Gene Predictions RefSeq mRNAs mapped to this assembly CpG Islands (Islands < 300 Bases are Light Green) RepeatMasker Repetitive Elements Simple Tandem Repeats by TRF Genomic Intervals Masked by WindowMasker + SDust

A-rich

GC Percent

Repeats