Scale CM064359.1:

Simple Repeats WM + SDust

5 kb GCA_032444005.1 417,804,000 417,805,000 417,806,000 417,807,000 417,808,000 417,809,000 417,810,000 417,811,000 417,812,000 GC Percent in 5-Base Windows RefSeq mRNAs mapped to this assembly RepeatMasker Repetitive Elements

Simple Tandem Repeats by TRF Genomic Intervals Masked by WindowMasker + SDust

NM_001277836.1 (TAT)n (TAT)n (TAT)n

(TAT)n

(TCTG)n

(GTGTGCT)n

GC Percent

Repeats